Development of an Acti ve Thr ee-dimensional V ision Interface f or Rehabilitation Robot System (P art of the Multimodal User Dir ection of a Rehabilitation Robot Pr oject) by Shoupu Chen

ASEL Technical Report #R OB9505

August 24, 1995

Applied Science & Engineering Laboratories University of Delawar e/A.I. duP ont Institute 1600 Rockland Rd., P .O. Box 269 Wilmington, DE 19803 Phone: (302)651-6830 FAX: (302)651-6895

asel